The Handbook
is a program that lets you adjust your Laserjet operating parameters.

Introduction
is a program that lets you adjust your Laserjet operating parameters. Some of 's printers such as the 5L or the 6L do no longer have a hardware control panel and the printer is controlled completely by software. However this software is often available only for the platform. seeks to fill the need for such software on the platform. It should work with any printer that understands 's PJL ( Printer Job Language). However some features may have no effect on your particular model.
I hope you will enjoy this little tool.
Bernd Johannes Wuebben wuebben@kde.org